Zeno — ܙܝܢܘܢ
edition published: 2024-01-12-06:00
language: en
availability: Distributed under a Creative Commons Attribution 3.0 Unported License. (http://creativecommons.org/licenses/by/3.0/)

Zeno; Zinon; ܙܝܢܘܢ; Fl. Zenon 7; Zeno (emperor); ܙܐܝܢܘܢ; Zenon
identifier: http://syriaca.org/person/2273
identifier: http://syriaca.org/johnofephesus/persons/2273
identifier: https://en.wikipedia.org/wiki/Zeno_(emperor)
identifier: Fl. Zenon 7
Zeno ruled the eastern half of the Roman Empire from 474 to his death in 491. His reign was threatened several times by usurpers.
floruit: 483/4
floruit: 474-491
death: 0491-04-09
male
state: Emperor of Rome
Chronica Minora 8
Cowper, Selections from the Syriac. No. 1: The Chronicle of Edessa 72
Martindale, The Prosopography of the Later Roman Empire, vol. 2: A.D. 395-527 II 1200-02
264 3.5.14
Zenon 7 1200-1202
1200-1202
264