Germanus (patricius) - ܓܪܡܢܐ
edition published: 2024-02-16-06:00
language: en
availability: Distributed under a Creative Commons Attribution 4.0 International License. (http://creativecommons.org/licenses/by/4.0/)

Germanus (patricius); ܓܪܡܢܐ; Germanus
identifier: http://syriaca.org/person/5092
identifier: http://syriaca.org/johnofephesus/persons/5092
identifier: https://en.wikipedia.org/wiki/Germanus_(cousin_of_Justinian_I)
Germanus was a cousin of the emperor Justinian and served as general in the theatres of war in the Balkans and against the Persians. In 550, he was appointed to bring the war against the Ostrogoths in Italy to a conclusion, yet he died before arriving there. He was father of the patricius Justinian who served as general under Justin II.
floruit: 519-550
male
285; 300; 330 3.6.4; 3.6.8; 3.6.27
Germanus 4 505-507
505-507
285; 300; 330