The Cathedral of Antioch
edition published: 2024-02-16-06:00
language: en
availability: Distributed under a Creative Commons Attribution 4.0 International License. (http://creativecommons.org/licenses/by/4.0/)

The Cathedral of Antioch; ܥܕܬܐ
The ecclesiastical centre of the patriarchate of Antioch, the great main church of Antioch was originally erected in the time of Constantine and underwent several restorations in the following centuries due to damage sustained in the frequent earthquakes which hit the city.
identifier: http://syriaca.org/place/5592
identifier: http://syriaca.org/johnofephesus/places/5592
identifier: https://en.wikipedia.org/wiki/Domus_Aurea_(Antioch)
157 3.3.29
644-650