Hagia Sophia (Great Church) - ܥܕܬܐ ܪܒܬܐ
edition published: 2024-02-16-06:00
language: en
availability: Distributed under a Creative Commons Attribution 4.0 International License. (http://creativecommons.org/licenses/by/4.0/)

Hagia Sophia (Great Church); ܥܕܬܐ ܪܒܬܐ; Hagia Sophia (Great Church); ܥܕܬܐ ܪܒܬܐ; ܥܕܬܐ; Ἁγία Σοφία (μέγαλη ἐκκλησία); Hagia Sophia (Große Kirche)
The monumental main church of Constantinople was destroyed during the Nika riots in 532, then rebuilt by Justinian on an even greater scale. Known as the Great Church, it played a major role in imperial ceremonies throughout the Byzantine period.
location: 41.008548 28.979938
identifier: http://syriaca.org/place/5609
identifier: http://syriaca.org/johnofephesus/places/5609
identifier: https://pleiades.stoa.org/places/307220778
identifier: https://en.wikipedia.org/wiki/Great_Church
892-895
96; 144; 172 3.2.29; 3.3.17; 3.3.39
13; 96; 106; 134; 138; 153; 160 3.1.12; 3.2.29; 3.2.39; 3.3.9; 3.3.13; 3.3.26; 3.3.31
84
https://pleiades.stoa.org/places/307220778/imagery-location