Chlomaron - ܟܠܝܡܪ
edition published: 2024-02-16-06:00
language: en
availability: Distributed under a Creative Commons Attribution 4.0 International License. (http://creativecommons.org/licenses/by/4.0/)

Chlomaron; ܟܠܝܡܪ; Chlomaron; ܟܠܝܡܪ
Chlomaron was a Persian fortress in Armenia close to the border with the Roman Empire and adjacent to the fortress of Aphum. Joh. Eph., EH 6.34, records that Maurice failed to take this fortress during his campaign in 578.
location: 38.026197 41.484335
identifier: http://syriaca.org/place/5591
identifier: http://syriaca.org/johnofephesus/places/5591
identifier: https://pleiades.stoa.org/places/874421
270
338 3.6.34
255 and 270
https://pleiades.stoa.org/places/874421